\input lcustom
\documentstyle[11pt,sfwmac,a4]{article}
\begin{document}
\input{dist-params}

\raggedright\pretolerance=10000\tolerance=10000
\def\pgm#1{#1}
\input{announce}
\input{contents}
\newpage
\input{distrib}
\end{document}
